SCHEDULE 2 Permitted alternative descriptions to the reserved descriptions specified in Schedule 1
Regulation 2(1)
1 The term “evaporated milk” may be used instead of the term “condensed milk” in the case of partly dehydrated milk containing, by weight, at least 9% fat and 31% total milk solids.
Sch. 2 para. 1 in force at 6.4.2015, see reg. 1(1)
2 The term “evaporated semi-skimmed milk” may be used instead of the term “condensed partly skimmed milk” in the case of partly dehydrated milk containing, by weight, between 4% and 4.5% fat and not less than 24% total milk solids.
Sch. 2 para. 2 in force at 6.4.2015, see reg. 1(1)
3 The term “semi-skimmed milk powder” or “dried semi-skimmed milk” may be used instead of the term “dried partly skimmed milk” or “partly skimmed milk powder” in the case of totally dehydrated milk with a fat content of between 14% and 16%.
Sch. 2 para. 3 in force at 6.4.2015, see reg. 1(1)