PART 2 GENERAL USE OF ULTRA-WIDEBAND EQUIPMENT

7 Mitigation techniques
The mitigation techniques referred to in regulation 6 are—
(a) the low duty cycle mitigation technique and its limits described in harmonised standard EN 302 065-1; and
EN 302 065-1 (Version 1.3.1) published in April 2014.
(b) the detect and avoid mitigation technique and its limits described in harmonised standard EN 302 065-1.