PART 6 USE OF ULTRA-WIDEBAND EQUIPMENT FOR MATERIAL SENSING DEVICES

26 Terms, provisions and limitations for non-fixed installations
1 The exemption provided for in regulation 24 shall also apply to ultra-wideband equipment which is a material sensing device and which complies with the requirements of paragraphs (2) to (4) of this regulation.
2 The ultra-wideband equipment must—
(a) only have the transmitter turned on by a manually operated non-locking switch;
(b) be in contact with or in close proximity to the investigated material; and
(c) direct the emissions into the direction of the object of the analysis.
3 the ultra-wideband equipment must not cause or contribute to undue interference to other users of the electromagnetic spectrum.
4 The ultra-wideband equipment must only emit signals that are radiated into the air which—
(a) are kept to a minimum; and
(b) if the equipment were to be placed on a representative wall (as defined within Annex D of harmonised standards EN 302-435-1 and EN 302 498-1) would be in accordance with the condition in regulation 28.
EN 302 435-1 (Version 1.3.1 published in December 2009.
EN 302 498-1 (Version 1.1.1) published in June 2010.