SCHEDULE 8 Marine Licence 1: Project A Offshore Generation – Work Nos. 1A and 2T

PART 2 Conditions

3 Detailed offshore design parameters
(1) No wind turbine generator may—
(a) exceed a height of 315 metres when measured from HAT to the tip of the vertical blade;
(b) have a rotor diameter exceeding 215 metres;
(c) be less than a multiple of 6 times the rotor diameter from the nearest wind turbine generator in any direction being not less than 750 metres measured between wind turbine generators;
(d) have a distance of less than 26 metres between the lowest point of the rotating blade of the wind turbine generator and HAT.
(2) The total rotor-swept area within Work No. 1A must not exceed 4.35 square kilometres.
(3) References to the location of a wind turbine generator are references to the centroid point at the base of the wind turbine generator.