SCHEDULE 10 Marine Licence 3: Project A Offshore Transmission - Work Nos. 2A, 3A and 2T

PART 2 Conditions

9 Detailed offshore design parameters
Within Work Nos. 1A and 2A, the HVDC cable crossings must not, in total, exceed—
(a) 16 in number;
(b) 88,450 cubic metres in volume of cable crossing material;
(c) 98,100 square metres in seabed footprint.