SCHEDULE 10 Marine Licence 3: Project A Offshore Transmission - Work Nos. 2A, 3A and 2T

PART 2 Conditions

5 Detailed offshore design parameters
(1) The total seabed footprint of foundation structures (excluding mooring buoys) within Work No. 1A (including subsea scour protection and drill arising deposits) must not exceed 1,116,850 square metres.
(2) The total seabed footprint of offshore platform foundation structures within Work No. 1A (including seabed scour protection and drill arising deposits) must not exceed 88,300 square metres.