11 Amendment of Part 2 of the Schedule (selecting a licensed supplier in respect of a BPPA)
1 For paragraph 5(2) of the Schedule substitute—

“2 The Authority must take no account of any bid made by a licensed supplier which—
(a) is not connected to a GSP group that is specified in the eligible generator’s project information in relation to the generating station specified in that project information; or
(b) was submitted before a revised OLR notice was issued in accordance with paragraph 3(1A) or 3(2)(c).”

.
2 For paragraph 9(1) of the Schedule substitute—

“1 The Authority must take no account of any bid made by a licensed supplier which—
(a) is not connected to a GSP group that is specified in the eligible generator’s project information in relation to the generating station specified in that project information; or
(b) was submitted before a revised OLR notice was issued in accordance with paragraph 3(1A) or 3(2)(c).”

.
3 In paragraph 12(a) of the Schedule before “OLR” insert “the”.