SCHEDULES

SCHEDULE 13 PROTECTIVE PROVISIONS

PART 2 FOR THE PROTECTION OF NATIONAL GRID

Removal of apparatus
28 (1) If, in the exercise of the agreement reached in accordance with paragraph 27, or in any other authorised manner, the undertaker acquires any interest in any land in which any apparatus is placed, that apparatus must not be removed under this Part of this Schedule and any right of the statutory undertaker to maintain that apparatus in that land must not be extinguished until alternative apparatus has been constructed, and is in operation to the reasonable satisfaction of the statutory undertaker in accordance with sub-paragraphs (2) to (5).
(2) If, for the purpose of executing any works in, on, under or over any land purchased, held, appropriated or used under this Order, the undertaker requires the removal of any apparatus placed in that land, it must give to the statutory undertaker 56 days’ advance written notice of that requirement, together with a plan of the work proposed, and of the proposed position of the alternative apparatus to be provided or constructed and in that case (or if in consequence of the exercise of any of the powers conferred by this Order the statutory undertaker reasonably needs to remove any of its apparatus) the undertaker must, subject to sub-paragraph (3), afford to the statutory undertaker to its reasonable satisfaction (taking into account paragraph 29(1)) the necessary facilities and rights—
(a) for the construction of alternative apparatus in other land of or secured by the undertaker; and
(b) subsequently for the maintenance of that apparatus.
(3) If alternative apparatus or any part of such apparatus is to be constructed elsewhere than in other land of or secured by the undertaker, or the undertaker is unable to afford such facilities and rights as are mentioned in sub-paragraph (2), in the land in which the alternative apparatus or part of such apparatus is to be constructed, the statutory undertaker must, on receipt of a written notice to that effect from the undertaker, take such steps as are reasonable in the circumstances in an endeavour to obtain the necessary facilities and rights in the land in which the alternative apparatus is to be constructed.
(4) Any alternative apparatus to be constructed in land of or secured by the undertaker under this Part of this Schedule must be constructed in such manner and in such line or situation as may be agreed between the statutory undertaker and the undertaker (both acting reasonably).
(5) The statutory undertaker must, after the alternative apparatus to be provided or constructed has been agreed, and subject to the grant to the statutory undertaker of any such facilities and rights as are referred to in sub-paragraph (2) or (3), proceed without unnecessary delay to construct and bring into operation the alternative apparatus and subsequently to remove any apparatus required by the undertaker to be removed under the provisions of this Part of this Schedule.