SCHEDULES

SCHEDULE 2 REQUIREMENTS

Street lighting
12 (1) No part of the authorised development is to commence until a scheme of the lighting to be erected along the link road has been submitted to and approved in writing by the relevant planning authority.
(2) The scheme submitted under sub-paragraph (1) must include details of—
(a) the areas of the link road to be lit;
(b) the position of the lighting columns and their heights and designs, including their luminaires and any shielding that is to be incorporated into the lighting columns;
(c) the extent of the light spread from each column; and
(d) mitigation measures relating to lighting reflecting the proposals in the environmental statement.
(3) The authorised development must be carried out in accordance with the scheme approved under sub-paragraph (1).