SCHEDULE Entry and withdrawal registers
4 The holder must complete the registers with the information required by paragraphs 2 and 3 within 7 days of each—
(a) processing, delivery, despatch or disposal of oil; and
(b) calculation of stocks and determination of actual physical stocks as referred to in paragraph 2(b).