SCHEDULE 3 Repeals and Revocations
Regulation 16(2) and (3)

PART 1 Repeals
1. Title	2. Reference	3. Extent of repeal
Explosives Act 1875.	c. 17.	Sections 43 and 104.
Regulatory Enforcement and Sanctions Act 2008*.	c. 13.	In Schedule 6, in the entry relating to the Explosives Act 1875, “43”.
Health and Safety (Offences) Act 2008*.	c. 20.	Paragraph 1 of Schedule 3.

PART 2 Revocations
Instrument	Reference	Extent of Revocation
The Order of Secretary of State (No 5) relating to Compressed Acetylene in Admixture with Oil-Gas, 1898	S.R. & O. 1898/248	The whole instrument
The Order of Secretary of State (No 5A) relating to Compressed Acetylene in Admixture with Oil-Gas (1905)	S.R. & O. 1905/1128	The whole instrument
The Order of Secretary of State (No 9), dated June 23, 1919, relating to Compressed Acetylene contained in a Porous Substance (1919)	S.R.& O. 1919/809	The whole instrument
The Order in Council (No 30) prohibiting the Manufacture, Importation, Keeping, Conveyance or Sale of Acetylene when an Explosive as defined by the Order, 1937	S.R. & O. 1937/54	The whole instrument
The Compressed Acetylene Order 1947	S.R. & O. 1947/805	The whole instrument
The Compressed Acetylene (Importation) Regulations 1978	S.I. 1978/1723	The whole instrument
The Explosives Act 1875 (Exemptions) Regulations 1979	S.I. 1979/1378	The whole instrument
The Explosives Act 1875 etc. (Metrication and Miscellaneous Amendment) Regulations 1984	S.I. 1984/510	The whole instrument except for regulations 1(1) and (2)(a), 2 and Schedule 1 to the extent that they relate to section 32 of the Explosives Act 1875.
The Health and Safety (Fees) Regulations 2012	S.I. 2012/1652	Regulation 9(4) and (7) to (9) and Parts 3 and 5 to 7 of Schedule 8.