2013 No. 462
Clean Air, England
The Smoke Control Areas (Exempted Fireplaces) (England) Order 2013
Made 2nd March 2013
Laid before Parliament 5th March 2013
Coming into force 6th April 2013

The Secretary of State makes the following Order in exercise of the powers conferred by section 21 of the Clean Air Act 1993.
1993 c. 11.
The Secretary of State is satisfied that the fireplaces exempted by this Order can be used for burning fuel other than authorised fuels without producing any smoke or a substantial quantity of smoke.
Fuels declared by the Secretary of State to be authorised fuels for the purposes of Part 3 of the Clean Air Act 1993 under section 20(6) of that Act are specified in S.I. 2013/447.