SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 2 PROTECTION FOR OPERATORS OF ELECTRONIC COMMUNICATIONS CODE NETWORKS
11 (1) The following provisions of this Part of this Schedule have effect unless otherwise agreed in writing between the Council and the operator.
(2) In this Part of this Schedule—
“conduit system” has the same meaning as in the electronic communications code and references to providing a conduit system are to be construed in accordance with paragraph 1(3A) of that code;
“electronic communications apparatus” has the same meaning as in the electronic communications code;
“the electronic communications code” has the same meaning as in Chapter 1 of Part 2 of the Communications Act 2003;
“electronic communications code network” means—
(a) so much of an electronic communications network or conduit system provided by an electronic communications code operator as is not excluded from the application of the electronic communications code by a direction under section 106 of the Communications Act 2003; and
(b) an electronic communications network which the Secretary of State is providing or proposing to provide;
“electronic communications code operator” means a person in whose case the electronic communications code is applied by a direction under section 106 of the Communications Act 2003; and
“operator” means the operator of an electronic communications code network.
2003 c. 21. See section 106.
12 (1) Subject to sub-paragraphs (2) to (4), if as the result of the construction of the authorised works, or of any subsidence resulting from any of those works—
(a) any damage is caused to any electronic communications apparatus belonging to an operator (other than apparatus the repair of which is not reasonably necessary in view of its intended removal for the purposes of those works), or other property of an operator; or
(b) there is any interruption in the supply of the service provided by an operator,
(c) the Council must bear and pay the cost reasonably incurred by the operator in making good such damage or restoring the supply and must—
(i) make reasonable compensation to an operator for loss sustained by it; and
(ii) indemnify an operator against claims, demands, proceedings, costs, damages and expenses which may be made or taken against, or recovered from, or incurred by, an operator by reason, or in consequence of, any such damage or interruption.
(2) Nothing in sub-paragraph (1) imposes any liability on the Council with respect to any damage or interruption to the extent that it is attributable to the act, neglect or default of an operator, its officers, servants, contractors or agents.
(3) The operator must give the Council reasonable notice of any such claim or demand and no settlement or compromise of the claim or demand may be made without the consent of the Council which, if it withholds such consent, has the sole conduct of any settlement or compromise or of any proceedings necessary to resist the claim or demand.
(4) Any difference arising between the Council and the operator under this paragraph is to be referred to and settled by arbitration under article 47 (arbitration).
13 This Part of this Schedule does not apply to—
(a) any apparatus in respect of which the relations between the Council and an operator are regulated by the provisions of Part 3 of the 1991 Act; or
(b) any damage, or any interruption, caused by electro-magnetic interference arising from the construction or use of the authorised works.
14 Nothing in this Part of this Schedule affects the provisions of any enactment or agreement regulating the relations between the Council and an operator in respect of any apparatus laid or erected in land belonging to the Council on the date on which this Order is made of which the benefit and burden is transferred to the Council under article 36 (transfer of former Croxley Green Branch line).