SCHEDULE Information Provisions
Regulation 24

1 Reporting obligations of relevant institutions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Powers to request information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Production of documents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Failure to comply with request for information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 General power to disclose information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Application of provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (18.1.2016 at 4.00 p.m.) by The Iran (European Union Financial Sanctions) Regulations 2016 (S.I. 2016/36), regs. 1(1), 20(1)(a) (with regs. 18, 21)