SCHEDULE 3 ADDITIONAL FACTORS OR CRITERIA WHICH MAY BE TAKEN INTO ACCOUNT IN A LOCAL AUTHORITY’S FORMULA UNDER REGULATION 18
PART 1 7 Such physical facilities, organisational facilities or communications facilities as are found at some schools only.