PART 4 Transitional Provisions

45 Transitional provisions: interpretation
In regulations 46 and 47—
“relevant notification provision” means regulation 12(2) of the Building Regulations 2010 and sections 47(1), 50, 51A(2) and 54 of the Building Act 1984; and
“relevant regulations” means regulations 9, 15 or 17 of these Regulations.