2 Interpretation
In this Order—
“the Act” means the Energy Act 2004;
“the Distribution Connection and Use of System Agreement” means the document of that title referred to in the condition which, on 1st October 2008, constituted condition 22 of the standard conditions of distribution licences;
“distribution licence” means a licence granted under section 6(1)(c) of the Electricity Act 1989;
“transportation licence” means a licence granted under section 7 of the Gas Act 1986; and
“the Uniform Network Code” means the document of that title referred to in the condition which, on 1st October 2008, constituted condition 9 of the standard conditions of transportation licences.
1989 c.29. Section 6 was substituted by the Utilities Act 2000, section 30, and subsection (1)(c) was amended by the Energy Act 2004, section 197(9) and Schedule 23, Part 1.
1986 c.44. Section 7 was substituted by the Gas Act 1995 (c.45), section 5, and was amended by the Utilities Act 2000, sections 3 and 76, and Schedule 6, Part 1, paragraphs 1 and 4, and Schedule 8, and the Energy Act 2004, sections 149 and 197(9), and Schedule 23, Part 1.