4 Amendment, repeals and revocation consequential on regulation 3
1 In section 39(2) (record of gasholder examinations) of the 1961 Act for “entered in or attached to the general register” substitute “kept available for inspection.”.
2 The following provisions of the 1961 Act are repealed-
(a) section 122(7)(meaning of “general register” in relation to the application of the Act to parts of buildings let as separate factories);
(b) in sections 125(2)(j), 126(2)(j) and 127(2)(j) (application of provisions relating to general registers to things other than factories), the words “general registers (so far as applicable)”;
(c) in section 127(5) the word “general”; and
(d) in section 176(1) (interpretation), the definition of “general register”.
3 The Factories Act General Register Order 1973 (which relates to general registers kept under the 1961 Act) is revoked.
S.I. 1973/8.