2009 No. 383
Fees And Charges
The Medical Devices (Fees Amendments) Regulations 2009
Made 23rd February 2009
Laid before Parliament 3rd March 2009
Coming into force 1st April 2009

The Secretary of State makes these Regulations in exercise of the powers conferred by section 2(2) of the European Communities Act 1972 and section 56(1) and (2) of the Finance Act 1973.
1972 c.68. Under section 57(1) of the Scotland Act 1998 (c.46), despite the transfer to Scottish Ministers of functions in relation to implementing obligations under Community law in relation to devolved matters, the functions of the Secretary of State in relation to implementing these obligations continues to be exercisable by the Secretary of State as regards Scotland.
1973 c.51.
The Secretary of State has been designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to medical devices.
The Secretary of State was designated in relation to measures relating to active implantable medical devices in S.I. 1991/2289 and in relation to measures relating to medical devices other than active implantable medical devices in S.I. 1993/2661.
The Treasury has consented to the making of these Regulations as required by section 56(1) of the Finance Act 1973.