2009 No. 2577 (C. 111)
Olympic Games And Paralympic Games
Sports Grounds And Sporting Events
The London Olympic Games and Paralympic Games Act 2006 (Commencement No. 3) Order 2009
Made 23rd September 2009

The Paymaster General makes the following Order in exercise of the powers conferred by sections 40(2) and (4) of the London Olympic Games and Paralympic Games Act 2006:
2006 c.12. By article 3(1) and (2)(d) of S.I. 2007/2129, the functions of the Secretary of State under section 40(2) and (4) are exercisable concurrently with the Paymaster General.