3 Amendment of the Dental Charges Regulations
1 The Dental Charges Regulations are amended as follows.
2 In regulation 4 (calculation of charges)—
(a) in paragraph (1), for £15.90 substitute £16.20;
(b) in paragraph (2), for £43.60 substitute £44.60;
(c) in paragraph (3), for £194.00 substitute £198.00;
(d) in paragraph (4), for £194.00 substitute £198.00; and
(e) in paragraph (5), for £15.90 substitute £16.20.
3 In Schedule 3 to the Dental Charges Regulations (Band 3 Charges – Provision of Appliances) for paragraph (a) substitute—

“(a) laboratory fabricated porcelain or composite veneers, including acid etch  retention”

.