SCHEDULE GROUNDS FOR DISQUALIFICATION
15 The person’s tenure of office as the chair or as a member, director or governor of an NHS body has been terminated on the ground that—
(a) it was not in the interests of, or conducive to the good management of, that NHS body or the health service that that person should continue to hold that office;
(b) that person failed, without reasonable cause, to attend any meeting of that NHS body for a period of three months or more; or
(c) that person failed to declare a pecuniary interest or withdraw from consideration of any matter in respect of which that person had a pecuniary interest.