SCHEDULE 1 NON-IAS INDIVIDUAL ACCOUNTS

PART 3 NOTES TO THE ACCOUNTS

Information supplementing the balance sheet
45 Paragraphs 46 to 56 require information which either supplements the information given with respect to any particular items shown in the balance sheet or is otherwise relevant to assessing the LLP’s state of affairs in the light of the information so given.