PART 3 FREQUENCY OF INSPECTIONS

6 Frequency of inspections
1 The CSCI shall arrange for premises which are used for the purposes of a care home, agency or an adult placement scheme to be inspected a minimum of once in every three year period.
2 Any inspection referred to in paragraph (1) may be unannounced.
3 In this regulation, “three year period” means a period commencing on 1st April in any year and ending on 31st March in the third year following.