3 Application fee and the fee to begin the national phase
1 The application fee is—
(a) in respect of an international application for a patent (UK), nil;
(b) in respect of any other application for a patent, including an application treated as an application under the Act following a direction under section 81 (conversion of European patent applications), £30.
2 The prescribed fee to begin the national phase of an international application for a patent (UK) is £30.