1 Citation and commencement
This Order may be cited as the Offshore Installations (Safety Zones) (No.5) Order 2007 and shall come into force on 15th August 2007.

2 Revocation
The Offshore Installations (Safety Zones) (No.4) Order 2007 is revoked.
S.I. 2007/2004.

3 Establishment of safety zones
A safety zone is established around each installation specified in column 1 of the Schedule (being an installation stationed in waters to which subsection (7) of section 21 of the Petroleum Act 1987 applies) having a radius of five hundred metres from the point as respects that installation which has the co-ordinates of latitude and longitude according to European Datum (1950) specified in columns 2 and 3 of the Schedule.
Signed by authority of the Secretary of State for Work and Pensions.
Bill McKenzie Parliamentary Under-Secretary of State, Department for Work and Pensions 25th July 2007