SCHEDULE 8 Additional conditions that apply to the keeping of pigs

PART 2 General additional conditions

7 Artificially lit buildings
Where pigs are kept in an artificially lit building, lighting with an intensity of at least 40 lux must be provided for a minimum period of 8 hours per day subject to paragraph 16 of Schedule 1.