. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (9.1.2013) by The Energy Performance of Buildings (England and Wales) Regulations 2012 (S.I. 2012/3118), reg. 1(4), Sch. 3 (with reg. 44)