SCHEDULE 8 Drainage and water enquiries

PART 2 Enquiries and responses

15 Current basis for sewerage and water charges
(1) What is the current basis for charging for sewerage and water services at the property?
(2) (a) The charges are based on actual volumes of water measured through a water meter (“metered supply”);
(b) The charges are based on the rateable value of the property of £ give rateable value and the charge for the current financial year is £ give amount of charge;
(c) The charges are made on a basis other than rateable value or metered supply. They are based on give basis for charges and are £ give amount of charge for each financial year.
(d) Records indicate that this enquiry relates to a plot of land or a recently built property.