PART 1 Introduction

1 Title, application, commencement and interpretation
1 This Order—
(a) may be cited as the Veterinary Surgery (Artificial Insemination) Order 2007;
(b) applies in the United Kingdom save for Part 2 which applies in England only; and
(c) comes into force on 22nd May 2007.
2 In this Order—
“the Act” means the Veterinary Surgeons Act 1966;
“cow” means a cow of the bovine species, including bison and buffalo;
“veterinary surgeon” means a person who is registered in the register of veterinary surgeons or the supplementary veterinary register.