2007 No. 1070
National Health Service, England
The Good Hope Hospital National Health Service Trust (Dissolution) Order 2007
Made 29th March 2007
Coming into force 8th April 2007

The Secretary of State for Health makes the following Order in exercise of the powers conferred upon her by section 273(1) of, and paragraph 28(1) of Schedule 4 to, the National Health Service Act 2006.
2006 c. 41
The Secretary of State for Health makes this Order on the application of Good Hope Hospital National Health Service Trust following the completion of the consultation prescribed under paragraph 28(3) of Schedule 4 to the National Health Service Act 2006.
See S.I. 1996/653 for the prescribed consultation.

1 Citation and commencement
This Order may be cited as the Good Hope Hospital National Health Service Trust (Dissolution) Order 2007 and shall come into force on 8th April 2007.

2 Dissolution of NHS trust
The Good Hope Hospital National Health Service Trust established by the Good Hope Hospital National Health Service Trust (Establishment) Order 1992 is dissolved, and accordingly that Order is revoked.
S.I. 1992/2562.
Signed by the Secretary of State for Health
Patricia Hewitt Secretary of State for Health Department of Health 29th March 2007

EXPLANATORY NOTE
(This note is not part of the Order)
This Order provides for the dissolution on 8th April 2007 of the Good Hope Hospital National Health Service Trust established on 4th November 1992.