2 Amendment of the National Health Service (Charges for Drugs and Appliances) Regulations 2000
In the National Health Service (Charges for Drugs and Appliances) Regulations 2000, in regulation 2(1) (interpretation)—
(a) for the definition of “independent nurse prescriber” substitute the following definition—

““independent nurse prescriber” means a person—
(a) who is registered in the Nursing and Midwifery Register; and
(b) against whose name in that register is recorded an annotation signifying that he is qualified to order drugs, medicines and appliances as a community practitioner nurse prescriber, a nurse independent prescriber or a nurse independent/supplementary prescriber;”

;
This definition was inserted by S.I. 2003/699 and substituted by S.I. 2004/1771.
(b) for the definition of “nurses and midwives' professional registers” substitute the following definition—

““Nursing and Midwifery Register” means the register maintained by the Nursing and Midwifery Council under article 5 of the Nursing and Midwifery Order 2001;”

;
This definition was inserted by S.I. 2003/699 and amended by S.I. 2004/1771.
S.I. 2002/253.
(c) after the definition of “Patient Group Direction” insert the following definition—

““pharmacist independent prescriber” means a person—
(a) who is registered in the Register of Pharmaceutical Chemists maintained in pursuance of section 2(1) of the Pharmacy Act 1954 or the register maintained in pursuance of Articles 6 and 9 of the Pharmacy (Northern Ireland) Order 1976; and
1954 c. 61.
S.I. 1976/1213 (N.I. 22).
(b) against whose name in that register is recorded an annotation signifying that he is qualified to order drugs, medicines and appliances as a pharmacist independent prescriber;”

;
This definition was inserted by S.I. 2000/3189.
(d) in the definition of “prescriber”, after “a doctor,” insert “a pharmacist independent prescriber,”;
This definition was inserted by S.I. 2004/865.
(e) for the definition of “repeatable prescriber” substitute the following definition—

““repeatable prescriber” has the same meaning as in the National Health Service (Pharmaceutical Services) Regulations 2005;”

; and
This definition was inserted by S.I. 2004/865.
S.I. 2005/641.
(f) for the definition of “supplementary prescriber” substitute the following definition—

““supplementary prescriber” means a person—
(a) whose name is registered in—
(i) the Nursing and Midwifery Register,
(ii) the Register of Pharmaceutical Chemists maintained in pursuance of section 2(1) of the Pharmacy Act 1954,
1954 c. 61.
(iii) the register maintained in pursuance of Articles 6 and 9 of the Pharmacy (Northern Ireland) Order 1976,
S.I. 1976/1213 (N.I. 22).
(iv) the part of the register maintained by the Health Professions Council in pursuance of article 5 of the Health Professions Order 2001 relating to—
(aa) chiropodists and podiatrists,
(bb) physiotherapists, or
(cc) diagnostic or therapeutic radiographers, or
S.I. 2002/254; there are no relevant amending instruments.
(v) the register of optometrists maintained by the General Optical Council in pursuance of section 7 of the Opticians Act 1989; and
1989 (c. 44).
(b) against whose name is recorded in the relevant register an annotation signifying that he is qualified to order drugs and appliances as a supplementary prescriber or, in the case of the Nursing and Midwifery Register, a nurse independent/supplementary prescriber;”

.
This definition was as substituted by S.I. 2005/578 and amended by S.I. 2006/675.
S.I. 2000/620.