SCHEDULE 4 Other directives covering equipment
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (8.12.2016) by The Electromagnetic Compatibility Regulations 2016 (S.I. 2016/1091), regs. 1, 75(1) (with savings in regs. 74, 75 (as amended (31.12.2020) by S.I. 2019/696, reg. 1, Sch. 20 para. 33, 34 (which amending S.I. is itself amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1))