SCHEDULE 3 TECHNICAL DOCUMENTATION
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (28.12.2016) by The Measuring Instruments Regulations 2016 (S.I. 2016/1153), reg. 1(2), Sch. 3 para. 1 (with regs. 3(4), 5, 67(5), Sch. 3 para. 2)