(This note is not part of the Regulations)
These Regulations amend the National Health Service (Dental Charges) Regulations 1989.
Regulation 2 increases from £378 to £384 the maximum charge payable by the patient for dental treatment and appliances, where the contract or arrangement leading to the provision of such treatment or appliances is made on or after 1st April 2005.