8 Hybrid arrangements
1 The individual’s pension input amount for a period of account in respect of a hybrid arrangement shall be determined in accordance with section 237, modified as follows.
2 Omit the references to sections 231 and 235.
3 Sections 230, 232 to 234 and 236 shall be modified in accordance with regulation 5, 6 or 7, as the case may be.