SCHEDULE 2 EXEMPTED FACILITIES

Other Facilities
14 The following railway facilities—
(1) the station known as Waterloo International Terminal in London;
(2) Ashford International Passenger Station in Kent; and
(3) the light maintenance depot known as North Pole International at Mitre Way, London W10 6AT.