SCHEDULES

SCHEDULE 13 PROTECTIVE PROVISIONS

PART V PROTECTION FOR BRITISH WATERWAYS BOARD

Fencing
45 Where so required by the engineer Network Rail shall to the reasonable satisfaction of the engineer fence off any specified work or protective work or take such other steps as the engineer may require to be taken for the purpose of separating any specified work or protective work from a waterway, whether on a temporary or permanent basis or both.