2004 No. 1808
BUILDING AND BUILDINGS, ENGLAND AND WALES
The Building (Amendment) (No.2) Regulations 2004
Made 13th July 2004
Laid before Parliament 22nd July 2004
Coming into force 1st January 2005

The First Secretary of State in exercise of the powers conferred upon him by sections 1(1) and 3 of, and paragraphs 2, 4(a), 7, 8 and 10 of Schedule 1 to, the Building Act 1984, after consulting the Building Regulations Advisory Committee and such other bodies as appear to him to be representative of the interests concerned in accordance with section 14(3) of that Act, hereby makes the following Regulations:
1984 c. 55.

1 Citation and commencement
These Regulations may be cited as the Building (Amendment) (No. 2) Regulations 2004 and shall come into force on 1st January 2005.

2 Amendment of the Building Regulations 2000
1 The Building Regulations 2000 (“the principal Regulations”) are amended as follows.
S.I.2000/2531.Relevant amending instruments are S.I.2001/3335, 2002/440, 2002/2871 and 2003/2692.
2 In regulation 2(1) (interpretation)—
(a) in the definition of “controlled service or fitting” for “Part G, H, J or L”, substitute “Part G, H, J, L or P”;
(b) after the definition of “dwelling-house” insert—

““electrical installation” means fixed electrical cables or fixed electrical equipment located on the consumer’s side of the electricity supply meter;”

;
(c) after the definition of “European Technical Approval issuing body” insert—

““extra-low voltage” means voltage not exceeding—
(a) in relation to alternating current, 50 volts between conductors and earth; or
(b) in relation to direct current, 120 volts between conductors;”

;
(d) after the definition of “institution” insert—

““low voltage” means voltage not exceeding—
(a) in relation to alternating current, 1000 volts between conductors or 600 volts between conductors and earth; or
(b) in relation to direct current, 1500 volts between conductors or 900 volts between conductors and earth;”

.
3 In regulation 3 (meaning of building work), in paragraph (1A)(b), for “Part G, H or J” substitute “Part G, H, J or P”.
4 In regulation 6 (requirements relating to material change of use), in paragraph (1)(a), after the reference to L2 add “P1 and P2 (electrical safety);”.
5 In regulation 8 (limitation on requirements), for “Parts A to D, F to K and N” substitute “Parts A to D, F to K, N and P”.
6 At the beginning of regulation 9 (exempt buildings and work) insert “Subject to paragraph (2)” and add to that regulation the following paragraph—

“2 The requirements of Part P of Schedule 1 apply to—
(a) any greenhouse; and
(b) any small detached building falling within class VI in Schedule 2,
which in either case receives its electricity from a source shared with or located inside a dwelling.”

.
7 In regulation 12 (giving of a building notice or deposit of plans), for paragraph (5) substitute the following—

“5 A person who intends to carry out building work is not required to give a building notice or deposit full plans where the work consists only of work—
(a) described in column 1 of the Table in Schedule 2A if the work is to be carried out by a person described in the corresponding entry in column 2 of that Table, and paragraphs 1 and 2 of that Schedule have effect for the purposes of the descriptions in the Table;
(b) described in Schedule 2B.”

.
8 For regulation 16A (provisions applicable to replacement windows, rooflights, roof windows and doors) substitute the following—

“16A Provisions applicable to self certification schemes
1 This regulation applies where building work consists only of work of a type described in column 1 of Schedule 2A and the work is carried out by a person who is described in column 2 of that Schedule in respect of that type of work.
2 Where this regulation applies, the local authority is authorised to accept, as evidence that the requirements of regulations 4 and 7 have been satisfied, a certificate to that effect by the person carrying out the building work.
3 Where this regulation applies, the person carrying out the work shall, not more than 30 days after the completion of the work—
(a) give to the occupier a copy of the certificate referred to in paragraph (2); and
(b) give to the local authority—
(i) notice to that effect, or
(ii) the certificate referred to in paragraph (2).
4 Paragraph 3 of this regulation does not apply where a person carries out the building work described in Schedule 2B which consists only of work on a low voltage or an extra-low voltage electrical installation.”

.
9 In Schedule 1 (requirements), add Part P set out in Part 1 of the Schedule to these Regulations.
10 In Schedule 2A (exemptions from requirements to give building notice or deposit full plans), in the Table, after the paragraph relating to “the installation of replacement windows” insert in columns 1 and 2 the following—

“Installation of fixed low or extra-low voltage electrical installations.	A person registered by BRE Certification Limited, British Standards Institution, ELECSA Limited, NICEIC Certification Services Ltd, or Zurich Certification Limited in respect of that type of work.”

A company incorporated under the Companies Act 1985 (c. 6) with the registration number 3548352.
Incorporated by Royal Charter.
A company incorporated under the Companies Act 1985 with the registration number 5131470.
A company incorporated under the Companies Act 1985 with the registration number 4411293.
A company incorporated under the Companies Act 1985 with the registered number 70796.
11 After Schedule 2A, insert Schedule 2B as set out in Part 2 of the Schedule to these Regulations.

3 Transitional provisions
1 Subject to paragraph (2), where before 1st January 2005 building work is commenced in accordance with—
(a) a building notice given to, or full plans deposited with, a local authority under regulation 12(2) of the principal Regulations and a notice given to the local authority under regulation 15(1) of the principal Regulations; or
(b) an initial notice or an amendment notice given in accordance with section 47(1) or 51A(2) respectively of the Building Act 1984 (“the Act”),
the principal Regulations shall continue to apply to that building work as if the amendments made by regulation 2(2) to (6) and (9) had not been made.
2 Where an initial notice given before 1st January 2005 is varied by an amendment notice given on or after that date, the principal Regulations shall continue to apply as if the amendments made by regulation 2(2) to (6) and (9) had not been made, to so much of the building work as could have been carried out under that initial notice if the amendment notice had not been given.
3 Where before 1st January 2005 full plans of building work have been deposited with a local authority in accordance with regulation 12(2) of the principal Regulations and the local authority has, before that date—
(a) given notice under section 16(6) of the Act that they have passed those plans without conditions; or
(b) signified in writing to the person by whom or on whose behalf the plans were deposited that any condition subject to which they passed the plans has been fully met,
the principal Regulations shall continue to apply to that building work as if the amendments made by regulation 2(2) to (6) and (9) had not been made, whether or not the building work departs from those plans.
4 Where plans of work are the subject of a plans certificate, or a plans certificate combined with an initial notice, given to a local authority before 1st January 2005 in accordance with section 50 of the Act, and accepted by the local authority either before, on or after that date, the principal Regulations shall continue to apply to that building work as if the amendments made by regulations 2(2) to (6) and (9) had not been made, whether or not the building work departs from those plans.
5 In relation to building work of a description within the first 3 heads of column 1 of Schedule 2A (installation of a heat-producing gas appliance, of an oil-fired combustion appliance or oil storage tanks and pipes, or of a solid fuel burning combustion appliance) where the contract for the provision of the work was entered into before 1st April 2005 and the work was completed before 1st July 2005, the principal Regulations shall continue to apply to that building work as if the amendments made by regulation 2(8) had not been made.
6 In relation to building work of a description added to Schedule 2A by regulation 2(10) (installation of fixed low or extra-low voltage electrical installations in dwellings) where the contract for the work was entered into before 1st January 2005 and the work was completed before 1st April 2005, the principal Regulations shall continue to apply to that building work as if the amendments made by regulation 2(8) had not been made.
Signed by authority of the First Secretary of State
Phil Hope Parliamentary Under Secretary of State Office of the Deputy Prime Minister 13th July 2004
SCHEDULE
Regulation 2(9) and (11)

PART 1 PART P OF SCHEDULE 1 TO THE BUILDING REGULATIONS 2000, ADDED BY THESE REGULATIONS

“Requirement	Limits on application
PART P ELECTRICAL SAFETY	
Design, installation, inspection and testing	
P1 Reasonable provision shall be made in the design, installation, inspection and testing of electrical installations in order to protect persons from fire or injury. Provision of information P2 Sufficient information shall be provided so that persons wishing to operate, maintain or alter an electrical installation can do so with reasonable safety.	The requirements of this Part apply only to electrical installations that are intended to operate at low or extra-low voltage and are— (a) in a dwelling; (b) in the common parts of a building serving one or more dwellings, but excluding power supplies to lifts; (c) in a building that receives its electricity from a source located within or shared with a dwelling; and (d) in a garden or in or on land associated with a building where the electricity is from a source located within or shared with a dwelling.”

PART 2 NEW SCHEDULE 2B TO THE BUILDING REGULATIONS 2004

“SCHEDULE 2B DESCRIPTIONS OF WORK WHERE NO BUILDING NOTICE OR DEPOSIT OF FULL PLANS REQUIRED
Regulation 12(5)
1 Work consisting of—
(a) replacing any socket-outlet, control switch or ceiling rose;
(b) replacing a damaged cable for a single circuit only;
(c) re-fixing or replacing enclosures of existing installation components, where the circuit protective measures are unaffected;
(d) providing mechanical protection to an existing fixed installation, where the circuit protective measures and current carrying capacity of conductors are unaffected by the increased thermal insulation.
2 Work which—
(a) is not in a kitchen, or a special location,
(b) does not involve work on a special installation, and
(c) consists of—
(i) adding light fittings and switches to an existing circuit;
(ii) adding socket outlets and fused spurs to an existing ring or radial circuit; or
(iii) installing or upgrading main or supplementary equipotential bonding.
3 In paragraph 2—
“special installation” means an electric floor or ceiling heating system, a garden lighting or electric power installation, an electricity generator, or an extra-low voltage lighting system which is not a pre-assembled lighting set bearing the CE marking referred to in regulation 9 of the Electrical Equipment (Safety) Regulations 1994; and
“special location” means a location within the limits of the relevant zones specified for a bath, a shower, a swimming or paddling pool or a hot air sauna in the Wiring Regulations, sixteenth edition, published by the Institution of Electrical Engineers and the British Standards Institution as BS 7671: 2001 and incorporating amendments 1 and 2.
S.I.1994/3260 to which there are amendments not relevant to these Regulations.”

.

(This note is not part of the Regulations)
1 The Building Regulations 2000 (S.I.2000/2531 as amended by S.I.2000/3335, S.I.2002/440, S.I.2002/2871 and S.I.2003/2692), “the principal Regulations”, impose requirements on people carrying out certain building operations. These Regulations amend the principal Regulations. In addition to minor and drafting amendments the following changes of substance are made.
2 The definition of “controlled service or fitting” in regulation 2(1) of the principal Regulations is extended to include services or fittings in relation to which Part P (electrical safety) imposes a requirement (regulation 2(2)(a))
3 A new definition of “electrical installation” is inserted, as Part P imposes a requirement that reasonable provision shall be made in the design, installation, inspection and testing of ‘electrical installations’ (regulation (2)(2)(b)).
4 New definitions of “low voltage” and “extra low voltage” are inserted as Part P limits its application to these types of installations (regulations (2)(2) (c) and (d)).
5 Part P is added in regulation 3 (meaning of building work) paragraph (1A)(b) of the principal Regulations, so that the limitation on the definition of “building work” in relation to the provision of certain controlled services or fittings in existing dwellings does not apply to Part P (regulation 2(3)).
6 Changes are made to the requirements for specified material changes of use (amendments to regulation 6(1)(a)) of the principal Regulations (regulation 2(4)).
7 Part P is added to regulation 8 of the principal Regulations which provide that compliance with the listed Parts does not require anything to be done beyond what is necessary to secure reasonable standards of health and safety (regulation 2(5)).
8 A new paragraph is inserted in regulation 9 of the principal Regulations in order to make provision for Part P to apply to any greenhouse and any small-detached building (regulation 2(6)).
9 Changes are made to regulation 12(5) of the principal Regulations (the giving of a building notice or deposit of plans), where exemptions are made where the work is within Schedule 2A which is extended or 2B which is inserted (regulation 2(7), (10) and Part 2 of the Schedule).
10 A substitute regulation 16A is inserted, extending self certification schemes (regulation 2(8)).
11 Part P is inserted into Schedule 1 of the principal Regulations (regulation 2(9)).
12 Regulation 3 contains transitional provisions.
The Secretary of State has approved, under section 6(1) of the Building Act 1984, a new document containing practical guidance with respect to the requirements contained in Part P. The Approved Document [P] will be published by The Stationery Office.
A regulatory impact assessment has been prepared in relation to these regulations. A copy may be obtained from Buildings Division, ODPM, Zone18/B Portland House, Stag Place, London SW1E 5LP (Tel: 020 7944 5755; Fax 020 7944 5739; Email: bregse.br@odpm.gov.uk).
The Wiring Regulations BS 7671: 2001 and amendments (ISBN 0-86341-373-0) can be obtained from the Institution of Electrical Engineers, P.O. Box 96, Stevenage, Herts SG1 2SD (email sales@iee.org.uk) or the British Standards Institution, Customer Services, 389 Chiswick High Road, London W4 4AL (email cservices@bsi-global.com).