3 Amendments to orders
1 In Schedule 1 to the Offshore Installations (Safety Zones) Order 1997—
(a) in the entry relating to Balmoral Well 16/21A-7z, for “01° 08− 17.94' E” in column 3 there shall be substituted “01° 06− 17.94' E”;
(b) in the entry relating to Saltire Wellhead Protection Unit—
(i) for “50° 25− 31.03'” in column 2 there shall be substituted “58° 25− 31.04'”; and
(ii) for “00° 22− 5.1' E” in column 3 there shall be substituted “00° 22− 5.34' E”; and
(c) the following entries are deleted—
(i) Durward 1 Wellheads;
(ii) Durward 2 Wellheads; and
(iii) Dauntless Wellheads.
S.I.1997/735, to which there are amendments not relevant to this order.
2 In the Schedule to the Offshore Installations (Safety Zones) (No. 2) Order 1997, for “Osprey/Dunlin – Development Well” in column 1 there shall be substituted “Osprey/Dunlin – Development Well 211/23a-13”.
S.I.1997/1220.
3 In the Schedule to the Offshore Installations (Safety Zones) (No. 3) Order 1999, for “Buckland Development Field Block Well 9/18a-4” in column 1 there shall be substituted “Buckland Development Field Block Well 9/18a-28”.
S.I.1999/2206, to which there are amendments not relevant to this order.