SCHEDULE 3 ENGINEERING PLANT

PART 4 APPLICATION OF REGULATIONS MADE UNDER SECTION 41 OF THE ROAD TRAFFIC ACT 1988

Engineering plant treated as falling within Category 1, 2 or 3
24 Engineering plant, or a vehicle-combination that includes engineering plant, which falls within Category 1, 2 or 3 must comply with—
(a) the Construction and Use Regulations;
(b) the Authorised Weight Regulations; and
(c) the Lighting Regulations;
to the same extent as an AILV (or AILV-combination) falling within the same Category must, by virtue of paragraph 35 or 36 of Schedule 1, comply with those Regulations.