9 Amendment of Merchant Shipping (Port State Control) Regulations 1995
For regulation 8 there shall be substituted—

“8 Report of inspection to the master
On completion of an inspection, a more detailed inspection or an expanded inspection, the inspector shall draw up a report in accordance with the requirements of Annex X of MSN 1775 and a copy of such report shall be provided to the ship’s master.”

.