SCHEDULE 8 LABELLING

PART III LABELLING OF PACKAGES OF OFFICIALLY CERTIFIED PRE-BASIC SEED

7 Official label for a package of officially certified pre-basic seed
The minimum size of the label referred to in paragraph 4 shall be 110 mm x 67 mm.