SCHEDULE 8 LABELLING

PART IV Labelling of packages of officially certified basic, CS, C1 and C2 seed

10 Official label for a package of officially certified basic, CS, C1 or C2 seed
Where at least germination has been retested, the words “retested” followed by the month and year of retesting and the authority responsible for such retesting may be indicated on the official label referred to in paragraph 9 or on an official sticker attached to the official label.