3 Amendment of the Notification of Installations Handling Hazardous Substances Regulations 1982
Regulation 3 of the principal Regulations shall be amended by inserting, after the word “months”, the words “or, in the case of a hazardous substance consisting of ammonium nitrate or a mixture containing ammonium nitrate, at least 4 weeks”.