SCHEDULE 9 TEST PROCEDURES

PART V DEMONSTRATION OF COMPLIANCE
3 Performance of tests with models of appropriate scale incorporating those features which are significant with respect to the item under investigation when engineering experience has shown results of such tests to be suitable for design purposes. When a scale model is used, the need for adjusting certain test parameters, such as penetrator diameter or compressive load, must be taken into account.