2001 No. 1752
TERMS AND CONDITIONS OF EMPLOYMENT
The Dismissal Procedures Agreement Designation (Electrical Contracting Industry) Order 1991 Revocation Order 2001
Made 3rd May 2001
Laid before Parliament 8th May 2001
Coming into force 1st June 2001
Whereas by the Dismissal Procedures Agreement Designation (Electrical Contracting Industry) Order 1991 the Secretary of State, acting under the powers conferred on him by sections 65 and 66 of the Employment Protection (Consolidation) Act 1978, designated a dismissal procedures agreement entered into between the constituent parties of the Joint Industry Board for the Electrical Contracting Industry;
S.I.1991/1105.
1978 c. 44. Sections 65 and 66 were re-enacted (as amended) in section 110 of the Employment Rights Act 1996.
And whereas the said Order came into force on 1st July 1991 and the designation took effect on that day;
And whereas the Secretary of State is satisfied that the agreement designated by the said Order no longer satisfies all the conditions specified in section 110(3) of the Employment Rights Act 1996 and is required by section 110(4) of that Act, if he is so satisfied, to revoke an order designating a dismissal procedures agreement;
1996 c. 18. Section 110 has been amended in ways that are not relevant to this Order.
Now, therefore, the Secretary of State, in exercise of the powers conferred on him by sections 110(4) and (5) and 236(5) of the Employment Rights Act 1996 hereby makes the following Order—