PART V MONITORING—ADDITIONAL PROVISIONS

11 Interpretation of Part V
In this Part, in relation to residual disinfectant or a parameter specified as item 1, 2, 3, 4 or 6 in column (1) of Table 3 in Schedule 3, and the supply of a volume of water within one of the ranges shown in column (3) of that Table, “the standard number” and “the reduced number” means the number shown in column (5) and column (4), respectively, of that Table as applicable to residual disinfectant or the parameter in question by reference to a volume of water within that range.