SCHEDULE AWARDING BODIES
Regulation 4

A GCSE and GNVQ Awarding Bodies
Assessment and Qualifications Alliance
Edexcel Foundation
Northern Ireland Council for the Curriculum, Examinations and Assessment
Oxford, Cambridge and RSA Examinations
Welsh Joint Education Committee

B NVQ Awarding Bodies
Association of Accounting Technicians
Association of Industrial Truck Trainers
Automotive Management and Development Limited
Awarding Body for the Built Environment
The British Computer Society
The British Horse Society
British Horseracing Training Board
British Polymar Training Association
CABWI Awarding Body
Central Council for Education and Training in Social Work
Chartered Institute of Bankers
City and Guilds of London Institute
City and Guilds of London Institute
Confederation of International Beauty Therapy and Cosmetology
Construction Industry Training Board
Construction Industry Training Board Norther Ireland
Council for Awards in Children’s Care and Education
Distributive Occupational Standards Council
Edexcel Foundation
EMTA Awards Limited
Engineering Construction Industry Training Board
Engineering Training Council (Northern Ireland)
EPIC
Fibreboard Awarding Body
Glass Qualifications Authority
Hospitality Awarding Body
Institute of Linguists Education Trust
The Institute of Management Foundation
The Institute of the Motor Industry
Institute of Personnel and Development
Institute for Supervision and Management
Joint Examining Board
Joint Industry Board for the Electrical Contracting Industry
Leather Producing Industry Vocational Qualifications Board
London Chamber of Commerce & Industry Examinations Board
Local Government Management Board
Management Verification Consortium Ltd
Meat Training Council
NCC Education Services Ltd
National Examining Board for Supervisory Management
National Fencing Training Authority
National Proficiency Tests Council
Oxford, Cambridge and RSA Examinations
The Open University
Pitman Qualifications
Process Awards Authority
Qualifications for Industry Ltd
The Royal College of Veterinary Surgeons
Security Industry Training Organisation/Parking Committee for London
Steel Industry Qualifications Board
Telecommunications Vocational Standards Council
Vocational Qualifications in Science, Engineering & Technology
Vocational Training Charitable Trust

C National Entry Level Qualification Awarding Bodies
Assessment and Qualifications Alliance
Edexcel Foundation
Languages Development Centre (S Martin’s College)
Oxford, Cambridge and RSA Examinations
The Christian Theology Trust
Welsh Joint Education Committee

D National Qualifications in Scotland Awarding Body
SQA

E GSVQ Awarding Bodies
Association of Accounting Technicians
Association of Industrial Truck Trainers
Automotive Management and Development Limited
Confederation of International Beauty Therapy and Cosmetology
The British Horse Society
British Polymar Training Association
City and Guilds of London Institute
Electricity Training Association
EMTA Awards Ltd
Engineering Construction Industry Training Board
EPIC
Glass Qualifications Authority
Institute for Supervision and Management
Institute of the Motor Industry
Leather Producing Industry Vocational Qualifications Board
Local Government Management Board
Museum Training Institute
National Fencing Training Authority
National Proficiency Tests Council
NCC Education Services Ltd
The Open University
Qualifications for Industry Ltd
The Royal College of Veterinary Surgeons
Scottish Association of Master Bakers
SQA
Travel Training Company Ltd
Vocational Qualifications in Science, Engineering and Technology
Vocational Training Charitable Trust