SCHEDULES

SCHEDULE 2 FEES
5 The fee prescribed for the purposes of Rule 10(2) (restoration to the register of entry struck off the register) shall be–
(a) £100 in respect of an applicant who satisfies the Registrar that, by virtue of sickness or other reason he does not intend to engage in the practice of chiropractic within the United Kingdom, the Channel Islands, the Isle of Man or a European Economic Area State during the period ending 31st December in the year in which the restoration would fall to be made, or
(b) in any other case, £1,250.